/*
 Navicat Premium Data Transfer

 Source Server         : 0本地5.7.17
 Source Server Type    : MySQL
 Source Server Version : 50717
 Source Host           : localhost:3307
 Source Schema         : ygtx_gxt

 Target Server Type    : MySQL
 Target Server Version : 50717
 File Encoding         : 65001

 Date: 01/11/2025 17:32:09
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for sys_post_home_page
-- ----------------------------
DROP TABLE IF EXISTS `sys_post_home_page`;
CREATE TABLE `sys_post_home_page`  (
  `post_id` bigint(20) NOT NULL COMMENT '岗位ID',
  `home_page_type` varchar(20) NOT NULL COMMENT '首页ID',
  `status` char(1) CHARACTER SET utf8 COLLATE utf8_general_ci NOT NULL COMMENT '状态（0正常 1停用）',
  `create_by` varchar(64) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT '' COMMENT '创建者',
  `create_time` datetime NULL DEFAULT NULL COMMENT '创建时间',
  `update_by` varchar(64) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT '' COMMENT '更新者',
  `update_time` datetime NULL DEFAULT NULL COMMENT '更新时间',
  `remark` varchar(500) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL COMMENT '备注',
  PRIMARY KEY (`post_id`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8 COLLATE = utf8_general_ci ROW_FORMAT = Dynamic;

SET FOREIGN_KEY_CHECKS = 1;